


B 500
   41.98   48.05  153.23  1.4000E-03  2.1953E+01  9.4918E-16  2.2208E+00  0.0000E+00
  106.07  128.45   61.86  1.4000E-03  2.3347E+01  8.3206E-16  2.1850E+00  0.0000E+00
  115.13   54.28  147.32  1.4000E-03  2.0047E+01  9.4568E-16  2.4286E+00  0.0000E+00
   79.16  127.19   61.74  1.4000E-03  1.7556E+01  9.3294E-16  2.7859E+00  0.0000E+00
  -30.15  147.81  110.17  1.4000E-03  2.9211E+01  6.3069E-16  1.7997E+00  0.0000E+00
   93.91   96.31   31.35  1.4000E-03  8.8126E+00  1.1336E-15  5.4747E+00  0.0000E+00
  111.74  104.22  125.27  1.4000E-03  2.2360E+01  9.4314E-16  2.1518E+00  0.0000E+00
  -16.83   50.23   56.27  1.4000E-03  1.9716E+01  9.7463E-16  2.5927E+00  0.0000E+00
   94.58   23.63  100.70  1.4000E-03  1.9420E+01  8.4662E-16  2.4673E+00  0.0000E+00
  150.33   86.88   19.65  1.4000E-03  3.0462E+01  9.8957E-16  1.8334E+00  0.0000E+00
  117.55   77.88  107.87  1.4000E-03  2.8815E+01  7.1072E-16  1.7434E+00  0.0000E+00
   56.93  162.19   34.59  1.4000E-03  2.5418E+01  7.5876E-16  1.9172E+00  0.0000E+00
  -10.77  127.58  152.26  1.4000E-03  1.2208E+01  1.1223E-15  4.0100E+00  0.0000E+00
  110.97   48.89   82.92  1.4000E-03  2.0195E+01  7.8950E-16  2.3829E+00  0.0000E+00
   83.20   64.19  158.38  1.4000E-03  8.1698E+00  1.2257E-15  6.2167E+00  0.0000E+00
  -41.45  135.03   86.81  1.4000E-03  2.4826E+01  8.1026E-16  2.1601E+00  0.0000E+00
   33.50   95.41  151.79  1.4000E-03  3.0045E+01  5.2170E-16  1.7189E+00  0.0000E+00
  150.67   24.08   48.00  1.4000E-03  2.0996E+01  8.3691E-16  2.3284E+00  0.0000E+00
  135.50  164.09  102.53  1.4000E-03  3.2063E+01  4.9849E-16  1.6093E+00  0.0000E+00
   73.85   96.48   14.82  1.4000E-03  1.1901E+01  1.2027E-15  4.4437E+00  0.0000E+00
   34.21   40.71  165.22  1.4000E-03  2.3297E+01  9.3038E-16  2.0679E+00  0.0000E+00
  110.57  121.62   73.88  1.4000E-03  2.4215E+01  7.1488E-16  2.0711E+00  0.0000E+00
  103.21   15.97  106.93  1.4000E-03  3.0923E+01  5.2707E-16  1.6412E+00  0.0000E+00
   -4.30   80.79   22.77  1.4000E-03  6.5605E+00  1.1197E-15  7.3964E+00  0.0000E+00
   34.31  139.50  171.85  1.4000E-03  3.8873E+01  5.3566E-16  1.3585E+00  0.0000E+00
  127.80   58.56   80.68  1.4000E-03  2.9686E+01  5.4437E-16  1.7351E+00  0.0000E+00
  128.28  115.35  119.05  1.4000E-03  3.0642E+01  6.9101E-16  1.6553E+00  0.0000E+00
   -0.78   34.53   46.14  1.4000E-03  3.0892E+01  7.4494E-16  1.7016E+00  0.0000E+00
  -47.35   80.19   94.23  1.4000E-03  3.8991E+01  2.5019E-16  1.4052E+00  0.0000E+00
   58.54  155.95   17.34  1.4000E-03  3.9665E+01  3.7083E-16  1.3581E+00  0.0000E+00
   93.88   30.55  118.07  1.4000E-03  2.9625E+01  5.8352E-16  1.7122E+00  0.0000E+00
  -31.89   78.48   56.05  1.4000E-03  3.0755E+01  9.5426E-16  1.7813E+00  0.0000E+00
   12.77  132.46   96.45  1.4000E-03  1.4496E+01  1.0797E-15  3.2928E+00  0.0000E+00
  113.17   83.60    9.48  1.4000E-03  2.6972E+01  6.9803E-16  1.8378E+00  0.0000E+00
  130.95  126.91  103.64  1.4000E-03  2.7707E+01  6.3535E-16  1.8516E+00  0.0000E+00
   37.54   48.61   11.87  1.4000E-03  3.9312E+01  5.5435E-16  1.3724E+00  0.0000E+00
   -1.02   97.32  164.17  1.4000E-03  9.1364E+00  1.0799E-15  5.2909E+00  0.0000E+00
   99.75  169.78   71.14  1.4000E-03  3.0414E+01  5.6463E-16  1.6592E+00  0.0000E+00
  114.57   63.64   97.25  1.4000E-03  2.5549E+01  6.6137E-16  1.9562E+00  0.0000E+00
   31.28  145.81    6.94  1.4000E-03  2.6495E+01  8.4772E-16  1.8349E+00  0.0000E+00
   82.14   77.40  148.45  1.4000E-03  6.3241E+00  1.2000E-15  8.0142E+00  0.0000E+00
  142.50   20.02   67.14  1.4000E-03  2.8876E+01  5.9603E-16  1.7544E+00  0.0000E+00
  167.83  147.89  161.38  1.4000E-03  1.0414E+01  1.0991E-15  4.6789E+00  0.0000E+00
   86.12   88.75   76.60  1.4000E-03  4.3391E+00  1.1309E-15  1.1497E+01  0.0000E+00
  -22.90   72.64  132.75  1.4000E-03  1.6784E+01  1.1596E-15  3.0972E+00  0.0000E+00
   97.37  123.44   55.05  1.4000E-03  2.0673E+01  9.2598E-16  2.4383E+00  0.0000E+00
  101.71   92.67  121.26  1.4000E-03  1.4746E+01  1.0562E-15  3.2332E+00  0.0000E+00
  -27.37   45.94   55.18  1.4000E-03  2.0965E+01  9.1858E-16  2.4223E+00  0.0000E+00
   39.09    7.51  170.91  1.4000E-03  3.1943E+01  5.3963E-16  1.5902E+00  0.0000E+00
  120.42   92.29   87.96  1.4000E-03  3.2702E+01  4.7598E-16  1.5610E+00  0.0000E+00
  148.00   97.09  141.69  1.4000E-03  3.2532E+01  9.5335E-16  1.6942E+00  0.0000E+00
   85.75  155.53   64.91  1.4000E-03  2.3437E+01  7.6218E-16  2.0685E+00  0.0000E+00
  -18.88  121.69  113.20  1.4000E-03  1.7518E+01  1.0225E-15  2.9792E+00  0.0000E+00
  105.05   73.52   32.40  1.4000E-03  1.8664E+01  9.7555E-16  2.6149E+00  0.0000E+00
   91.88   86.06  160.76  1.4000E-03  9.5714E+00  1.0900E-15  5.0652E+00  0.0000E+00
  -31.70   26.17   76.77  1.4000E-03  3.2262E+01  5.9304E-16  1.6745E+00  0.0000E+00
   75.68   44.08  124.89  1.4000E-03  2.1759E+01  8.5925E-16  2.2441E+00  0.0000E+00
  118.85  120.90   46.16  1.4000E-03  2.3357E+01  9.3613E-16  2.1312E+00  0.0000E+00
  116.65   52.79   94.19  1.4000E-03  2.5586E+01  6.2195E-16  1.9650E+00  0.0000E+00
   25.74  134.70   -0.42  1.4000E-03  2.7099E+01  8.5818E-16  1.7970E+00  0.0000E+00
  -16.66  164.50  137.55  1.4000E-03  2.7056E+01  6.8669E-16  1.8377E+00  0.0000E+00
   98.21  103.78   61.36  1.4000E-03  1.5156E+01  1.0024E-15  3.2033E+00  0.0000E+00
   40.00  156.21  168.50  1.4000E-03  3.8636E+01  6.4570E-16  1.4438E+00  0.0000E+00
  -45.02   72.97   78.67  1.4000E-03  3.6618E+01  4.2608E-16  1.4834E+00  0.0000E+00
   57.08   45.50  131.88  1.4000E-03  1.5707E+01  1.0412E-15  3.1026E+00  0.0000E+00
  102.72  120.33   45.23  1.4000E-03  1.6183E+01  1.0725E-15  3.0596E+00  0.0000E+00
  124.02   65.11   92.00  1.4000E-03  3.0710E+01  5.1629E-16  1.6862E+00  0.0000E+00
   47.57  149.57   12.51  1.4000E-03  3.6450E+01  5.3697E-16  1.4176E+00  0.0000E+00
  -14.75  118.58  136.48  1.4000E-03  1.3482E+01  1.1162E-15  3.7113E+00  0.0000E+00
  126.52   33.09   60.94  1.4000E-03  1.7112E+01  9.1447E-16  2.8394E+00  0.0000E+00
  114.16   93.65  109.94  1.4000E-03  2.6338E+01  7.8676E-16  1.8535E+00  0.0000E+00
   -9.50   28.35   44.54  1.4000E-03  2.9267E+01  7.1634E-16  1.7490E+00  0.0000E+00
   71.21   63.36  160.91  1.4000E-03  2.3473E+01  1.1037E-15  2.2938E+00  0.0000E+00
  126.64  144.28   85.87  1.4000E-03  2.8995E+01  5.8412E-16  1.8175E+00  0.0000E+00
   89.46    9.62  148.53  1.4000E-03  3.0332E+01  9.5286E-16  1.8550E+00  0.0000E+00
   51.12  111.39   38.55  1.4000E-03  2.3604E+01  8.7512E-16  2.2008E+00  0.0000E+00
  -37.66  131.67  102.86  1.4000E-03  2.6496E+01  7.0364E-16  1.9944E+00  0.0000E+00
   80.35   68.88    0.57  1.4000E-03  3.7156E+00  1.1783E-15  1.3460E+01  0.0000E+00
  106.45   42.41  101.58  1.4000E-03  2.4378E+01  6.6467E-16  2.0344E+00  0.0000E+00
    0.39  107.85    3.05  1.4000E-03  8.6287E+00  1.0982E-15  5.6672E+00  0.0000E+00
   18.33  157.16  158.13  1.4000E-03  3.7452E+01  4.5936E-16  1.4157E+00  0.0000E+00
  126.19   69.91   77.27  1.4000E-03  3.3149E+01  4.7201E-16  1.5566E+00  0.0000E+00
  160.65   95.58  173.89  1.4000E-03  1.4410E+01  1.1993E-15  3.7227E+00  0.0000E+00
  103.51   19.76   90.50  1.4000E-03  1.8806E+01  8.6007E-16  2.5529E+00  0.0000E+00
   34.42   58.25  156.30  1.4000E-03  2.1856E+01  9.1758E-16  2.2560E+00  0.0000E+00
  104.36  133.08   60.63  1.4000E-03  2.4891E+01  7.9943E-16  2.0702E+00  0.0000E+00
  101.87   69.19  126.55  1.4000E-03  1.5865E+01  1.0454E-15  3.0770E+00  0.0000E+00
   49.85  157.56   46.72  1.4000E-03  8.8872E+00  1.1025E-15  5.4230E+00  0.0000E+00
   97.97  102.48   98.83  1.4000E-03  1.3003E+01  1.0019E-15  3.6838E+00  0.0000E+00
  163.11   47.96   27.63  1.4000E-03  1.2698E+01  1.1150E-15  3.9019E+00  0.0000E+00
  131.22  147.42  109.84  1.4000E-03  2.2483E+01  7.6694E-16  2.1977E+00  0.0000E+00
   16.25   60.43   23.42  1.4000E-03  2.7227E+01  7.8076E-16  1.8052E+00  0.0000E+00
   16.15   30.30  178.29  1.4000E-03  1.6776E+01  1.0234E-15  2.8439E+00  0.0000E+00
  105.99  108.74   81.46  1.4000E-03  2.1144E+01  7.8538E-16  2.2991E+00  0.0000E+00
  103.76   72.11  105.45  1.4000E-03  1.9272E+01  8.6207E-16  2.5243E+00  0.0000E+00
   17.26  147.61   10.27  1.4000E-03  1.1155E+01  1.1060E-15  4.2960E+00  0.0000E+00
   12.84  128.48  159.24  1.4000E-03  2.6008E+01  8.6169E-16  1.8768E+00  0.0000E+00
  124.87   40.66   78.11  1.4000E-03  2.4154E+01  6.7848E-16  2.0574E+00  0.0000E+00
  143.25  141.70  121.01  1.4000E-03  2.1796E+01  8.3023E-16  2.2929E+00  0.0000E+00
   56.85   78.48   25.03  1.4000E-03  2.3587E+01  9.7664E-16  2.2996E+00  0.0000E+00
  -31.41   28.87   89.69  1.4000E-03  2.3375E+01  9.6249E-16  2.3257E+00  0.0000E+00
   91.21   97.98    8.01  1.4000E-03  9.8187E+00  1.0741E-15  4.9385E+00  0.0000E+00
   92.10   58.21  155.02  1.4000E-03  7.1760E+00  1.1893E-15  6.8686E+00  0.0000E+00
  -13.83  108.07   75.08  1.4000E-03  4.2333E+00  1.1948E-15  1.1873E+01  0.0000E+00
   52.13  163.34  137.54  1.4000E-03  1.4551E+01  9.9808E-16  3.2864E+00  0.0000E+00
  147.46   67.45   50.46  1.4000E-03  2.8489E+01  9.3021E-16  1.8758E+00  0.0000E+00
  122.92  109.41   95.56  1.4000E-03  3.1701E+01  4.8543E-16  1.6140E+00  0.0000E+00
   23.89   23.81   11.97  1.4000E-03  3.5109E+01  5.7165E-16  1.4717E+00  0.0000E+00
  -12.14   92.15  153.42  1.4000E-03  3.5262E+00  1.2041E-15  1.4281E+01  0.0000E+00
  101.89  142.15   71.07  1.4000E-03  2.6648E+01  6.2452E-16  1.8847E+00  0.0000E+00
   87.72   96.26  158.94  1.4000E-03  9.2390E+00  1.0855E-15  5.3195E+00  0.0000E+00
  -36.54   43.42   71.12  1.4000E-03  2.5233E+01  7.3739E-16  2.0553E+00  0.0000E+00
   53.61   71.74  128.47  1.4000E-03  2.2211E+01  9.1118E-16  2.3797E+00  0.0000E+00
   95.52  151.16   26.78  1.4000E-03  1.1422E+01  1.1904E-15  4.5400E+00  0.0000E+00
  118.79   37.48  120.58  1.4000E-03  1.9565E+01  1.0285E-15  2.6934E+00  0.0000E+00
   83.23  119.93   47.03  1.4000E-03  2.0834E+01  9.6330E-16  2.4436E+00  0.0000E+00
   13.87  151.14  167.82  1.4000E-03  2.6042E+01  8.2799E-16  1.8798E+00  0.0000E+00
  114.96   66.56   87.95  1.4000E-03  2.5741E+01  6.5276E-16  1.9190E+00  0.0000E+00
  113.13  154.44   92.80  1.4000E-03  2.2503E+01  7.4826E-16  2.1661E+00  0.0000E+00
   -4.70   67.05   17.68  1.4000E-03  6.7885E+00  1.1495E-15  7.1498E+00  0.0000E+00
   63.17   25.50  141.54  1.4000E-03  2.7293E+01  7.3896E-16  1.7974E+00  0.0000E+00
  122.02  104.03   67.99  1.4000E-03  3.2123E+01  6.4941E-16  1.5949E+00  0.0000E+00
   97.27   60.35  148.92  1.4000E-03  1.0140E+01  1.1520E-15  4.8123E+00  0.0000E+00
   20.82  114.08   53.47  1.4000E-03  2.7410E+01  7.4848E-16  1.8320E+00  0.0000E+00
  -42.60  108.88  109.54  1.4000E-03  3.5920E+01  5.2520E-16  1.5084E+00  0.0000E+00
   31.01   18.51   26.95  1.4000E-03  3.1678E+01  9.3443E-16  1.7647E+00  0.0000E+00
   88.72   50.29  130.72  1.4000E-03  2.4217E+01  8.8122E-16  2.1151E+00  0.0000E+00
  -47.63  112.73   69.36  1.4000E-03  3.2655E+01  7.1674E-16  1.6379E+00  0.0000E+00
   -1.11  105.99  115.48  1.4000E-03  1.1740E+01  1.0123E-15  4.1670E+00  0.0000E+00
  145.54   33.34   26.34  1.4000E-03  1.1006E+01  1.1226E-15  4.6231E+00  0.0000E+00
  141.20  156.04  117.10  1.4000E-03  2.4072E+01  7.4558E-16  2.0598E+00  0.0000E+00
   44.13   91.15   19.68  1.4000E-03  3.5151E+01  4.5642E-16  1.5462E+00  0.0000E+00
   17.86   31.76 -177.20  1.4000E-03  2.1673E+01  9.4531E-16  2.2165E+00  0.0000E+00
  110.48  113.30   84.77  1.4000E-03  2.3710E+01  7.0260E-16  2.0699E+00  0.0000E+00
  113.84   29.82   92.09  1.4000E-03  2.5540E+01  6.3919E-16  1.9434E+00  0.0000E+00
    5.91  111.19   -7.96  1.4000E-03  1.3739E+01  1.0389E-15  3.4785E+00  0.0000E+00
   43.77  132.23  158.79  1.4000E-03  2.7126E+01  1.0292E-15  1.9837E+00  0.0000E+00
  139.40   56.13   63.59  1.4000E-03  2.7982E+01  7.3022E-16  1.8568E+00  0.0000E+00
  144.45  122.01  141.19  1.4000E-03  2.4483E+01  9.7523E-16  2.1239E+00  0.0000E+00
   17.33   55.36   55.32  1.4000E-03  1.8715E+01  9.7801E-16  2.6852E+00  0.0000E+00
  -37.50  104.10  110.19  1.4000E-03  3.5762E+01  6.6348E-16  1.5493E+00  0.0000E+00
   68.81  167.80   32.85  1.4000E-03  3.6839E+01  3.2244E-16  1.4283E+00  0.0000E+00
  106.11   79.62  109.44  1.4000E-03  1.9948E+01  8.9650E-16  2.4293E+00  0.0000E+00
  -15.43   18.63   43.86  1.4000E-03  2.7927E+01  6.8983E-16  1.7972E+00  0.0000E+00
   44.38   45.88  167.67  1.4000E-03  3.4770E+01  6.5309E-16  1.4693E+00  0.0000E+00
  119.28  132.47   82.02  1.4000E-03  2.6831E+01  6.0620E-16  1.9155E+00  0.0000E+00
  142.28   76.03  135.54  1.4000E-03  3.5085E+01  7.7952E-16  1.5486E+00  0.0000E+00
   91.39  129.79   62.52  1.4000E-03  2.2722E+01  7.8759E-16  2.1832E+00  0.0000E+00
  -17.71  151.10  102.96  1.4000E-03  2.2645E+01  9.9753E-16  2.3903E+00  0.0000E+00
   99.67   94.16   19.18  1.4000E-03  1.5506E+01  1.0023E-15  3.0855E+00  0.0000E+00
   86.04  117.60 -167.09  1.4000E-03  3.3318E+00  1.1968E-15  1.4813E+01  0.0000E+00
  -31.67   58.13   87.91  1.4000E-03  2.2906E+01  9.3465E-16  2.3638E+00  0.0000E+00
   73.17    4.40  129.90  1.4000E-03  2.6119E+01  7.0661E-16  1.8842E+00  0.0000E+00
  137.32   70.87   60.53  1.4000E-03  3.5638E+01  6.1370E-16  1.5021E+00  0.0000E+00
  116.71   69.88  100.61  1.4000E-03  2.7409E+01  6.6065E-16  1.8385E+00  0.0000E+00
   45.38  156.19   20.17  1.4000E-03  2.7879E+01  7.4491E-16  1.7612E+00  0.0000E+00
  -20.01  123.51  140.85  1.4000E-03  1.5638E+01  1.1032E-15  3.2266E+00  0.0000E+00
  109.21   56.72   73.86  1.4000E-03  1.7894E+01  9.0741E-16  2.6687E+00  0.0000E+00
  110.30  134.26   96.48  1.4000E-03  1.9677E+01  8.0354E-16  2.4425E+00  0.0000E+00
  -11.86   55.56   27.71  1.4000E-03  9.8163E+00  1.1556E-15  5.0048E+00  0.0000E+00
   57.89   20.01  144.56  1.4000E-03  2.5384E+01  7.7644E-16  1.9172E+00  0.0000E+00
  116.45  105.45   71.60  1.4000E-03  2.7964E+01  7.0455E-16  1.7944E+00  0.0000E+00
  149.78   93.56  161.72  1.4000E-03  3.1139E+01  9.5996E-16  1.7980E+00  0.0000E+00
   91.52  160.44   76.66  1.4000E-03  1.9225E+01  8.5971E-16  2.4942E+00  0.0000E+00
  -17.28  131.89  124.17  1.4000E-03  2.1452E+01  9.2593E-16  2.3874E+00  0.0000E+00
  109.63   80.59   54.91  1.4000E-03  2.1153E+01  9.6514E-16  2.2626E+00  0.0000E+00
  111.43   78.47  116.10  1.4000E-03  2.3459E+01  8.8464E-16  2.0830E+00  0.0000E+00
   -8.18   10.95   48.34  1.4000E-03  3.8326E+01  2.8235E-16  1.4065E+00  0.0000E+00
  104.27   57.65   90.46  1.4000E-03  1.8785E+01  8.2428E-16  2.5526E+00  0.0000E+00
  171.82  129.14  -17.66  1.4000E-03  7.8078E+00  1.1626E-15  6.2507E+00  0.0000E+00
  117.93   40.01  103.33  1.4000E-03  2.7580E+01  6.4511E-16  1.8931E+00  0.0000E+00
   48.90  131.24   18.43  1.4000E-03  3.3762E+01  6.8556E-16  1.5174E+00  0.0000E+00
   -6.79  156.39  146.67  1.4000E-03  2.6004E+01  7.6275E-16  1.9068E+00  0.0000E+00
  109.64   91.55   77.21  1.4000E-03  2.3323E+01  7.9034E-16  2.0824E+00  0.0000E+00
   66.97   17.04  153.58  1.4000E-03  3.9133E+01  3.1421E-16  1.3773E+00  0.0000E+00
  -39.40   83.11   77.82  1.4000E-03  3.8637E+01  5.3919E-16  1.4551E+00  0.0000E+00
   16.95  130.27  134.77  1.4000E-03  2.4306E+01  9.2026E-16  2.1203E+00  0.0000E+00
  142.63   54.06   48.75  1.4000E-03  2.4795E+01  8.8960E-16  2.0694E+00  0.0000E+00
  128.97  115.90   93.06  1.4000E-03  3.2171E+01  4.8167E-16  1.6360E+00  0.0000E+00
   49.15   34.48   -6.08  1.4000E-03  4.0192E+01  4.9825E-16  1.3418E+00  0.0000E+00
    9.88   90.52  158.06  1.4000E-03  1.7421E+01  8.8906E-16  2.7486E+00  0.0000E+00
  102.86  152.83   65.86  1.4000E-03  3.2553E+01  4.7651E-16  1.6051E+00  0.0000E+00
  105.07   62.12  113.82  1.4000E-03  2.0544E+01  8.7296E-16  2.4150E+00  0.0000E+00
   27.90  138.04   19.50  1.4000E-03  1.4217E+01  1.0836E-15  3.3713E+00  0.0000E+00
   52.13  115.37 -175.86  1.4000E-03  3.9450E+01  6.0493E-16  1.4115E+00  0.0000E+00
  127.00   36.67   85.82  1.4000E-03  2.7292E+01  5.8835E-16  1.8768E+00  0.0000E+00
  161.41  169.86  151.54  1.4000E-03  1.5486E+01  9.6290E-16  3.1105E+00  0.0000E+00
   16.93   78.69   41.96  1.4000E-03  2.1952E+01  7.4665E-16  2.2168E+00  0.0000E+00
  -48.75   62.32  102.29  1.4000E-03  3.0677E+01  6.6169E-16  1.7419E+00  0.0000E+00
   81.71  133.10   38.00  1.4000E-03  2.8743E+01  8.5887E-16  1.8344E+00  0.0000E+00
   96.50   45.79  112.87  1.4000E-03  2.3754E+01  7.3653E-16  2.0895E+00  0.0000E+00
  -28.56   93.46   39.78  1.4000E-03  2.8004E+01  1.0574E-15  1.9513E+00  0.0000E+00
   25.13  170.83  174.76  1.4000E-03  3.2242E+01  5.2646E-16  1.5780E+00  0.0000E+00
  117.73   87.86   84.88  1.4000E-03  3.0306E+01  5.6750E-16  1.6574E+00  0.0000E+00
  143.66  119.45  128.94  1.4000E-03  2.7040E+01  8.8966E-16  1.9324E+00  0.0000E+00
   30.56   41.01   40.57  1.4000E-03  1.8421E+01  1.1292E-15  2.8193E+00  0.0000E+00
  -33.00   86.36  103.00  1.4000E-03  3.2480E+01  8.7640E-16  1.7332E+00  0.0000E+00
   80.18  143.47   31.29  1.4000E-03  3.2506E+01  8.1985E-16  1.6697E+00  0.0000E+00
   97.18   67.88  142.29  1.4000E-03  1.0921E+01  1.1421E-15  4.4530E+00  0.0000E+00
    7.00  133.69   49.45  1.4000E-03  2.8802E+01  8.2009E-16  1.7789E+00  0.0000E+00
   96.67   89.72  113.45  1.4000E-03  1.1344E+01  1.0663E-15  4.2420E+00  0.0000E+00
  160.51   34.16   39.04  1.4000E-03  1.9347E+01  9.2725E-16  2.5383E+00  0.0000E+00
  120.77  127.76   90.01  1.4000E-03  2.6679E+01  5.8742E-16  1.8984E+00  0.0000E+00
   31.36   44.71    2.05  1.4000E-03  3.3544E+01  6.9340E-16  1.5014E+00  0.0000E+00
   16.18   36.00  154.15  1.4000E-03  9.5524E+00  1.1946E-15  5.3088E+00  0.0000E+00
  100.61  111.58   61.04  1.4000E-03  1.8012E+01  9.4755E-16  2.7245E+00  0.0000E+00
  101.90  108.04  132.74  1.4000E-03  1.5150E+01  1.0709E-15  3.2032E+00  0.0000E+00
  -26.85   57.94   58.90  1.4000E-03  2.0856E+01  9.9069E-16  2.4968E+00  0.0000E+00
   88.45   44.56   98.95  1.4000E-03  1.2540E+01  9.9074E-16  3.8015E+00  0.0000E+00
  128.60   97.87   13.72  1.4000E-03  3.8054E+01  3.3365E-16  1.4001E+00  0.0000E+00
  130.60   72.40  109.24  1.4000E-03  3.5011E+01  6.1879E-16  1.5277E+00  0.0000E+00
   86.00  135.44   49.28  1.4000E-03  2.8249E+01  7.3996E-16  1.8204E+00  0.0000E+00
    9.92   96.50  169.75  1.4000E-03  1.7673E+01  9.1366E-16  2.7116E+00  0.0000E+00
  126.44    6.59   76.61  1.4000E-03  2.5984E+01  7.0446E-16  1.8953E+00  0.0000E+00
  116.22  118.14   99.20  1.4000E-03  2.5011E+01  6.9122E-16  1.9591E+00  0.0000E+00
   -3.74   34.64   31.24  1.4000E-03  2.2893E+01  9.0837E-16  2.1489E+00  0.0000E+00
   71.30   66.37  152.05  1.4000E-03  2.3511E+01  1.0408E-15  2.2663E+00  0.0000E+00
  116.58  157.74   70.56  1.4000E-03  3.4824E+01  5.2858E-16  1.5715E+00  0.0000E+00
  108.61   51.81  173.34  1.4000E-03  2.0625E+01  7.9094E-16  2.3375E+00  0.0000E+00
   26.26   96.53   80.36  1.4000E-03  3.1165E+01  5.4150E-16  1.6199E+00  0.0000E+00
  -32.57  141.50  118.64  1.4000E-03  2.4264E+01  7.6177E-16  2.0926E+00  0.0000E+00
   95.88   95.23   48.00  1.4000E-03  1.0204E+01  1.1220E-15  4.7192E+00  0.0000E+00
   75.48  111.51 -171.11  1.4000E-03  1.0645E+01  1.2352E-15  4.9003E+00  0.0000E+00
  -44.98   39.54   85.34  1.4000E-03  2.7651E+01  6.2847E-16  1.9041E+00  0.0000E+00
   34.98   72.71  152.83  1.4000E-03  2.5872E+01  7.2443E-16  1.9608E+00  0.0000E+00
   99.04  148.76   52.05  1.4000E-03  3.1816E+01  6.9838E-16  1.6959E+00  0.0000E+00
  121.63   14.84   98.53  1.4000E-03  3.6930E+01  3.1084E-16  1.4566E+00  0.0000E+00
   62.74  106.08   15.44  1.4000E-03  3.0068E+01  9.4279E-16  1.8442E+00  0.0000E+00
  -11.15  141.34  140.21  1.4000E-03  2.2241E+01  9.0363E-16  2.2317E+00  0.0000E+00
  115.65   68.72   74.18  1.4000E-03  2.5268E+01  7.4159E-16  1.9282E+00  0.0000E+00
  131.14  167.52  111.94  1.4000E-03  2.2359E+01  7.9692E-16  2.1780E+00  0.0000E+00
    6.04   74.37   21.06  1.4000E-03  1.6015E+01  9.7149E-16  2.9716E+00  0.0000E+00
   76.18   38.94  142.29  1.4000E-03  3.3050E+01  6.6622E-16  1.5858E+00  0.0000E+00
  126.90  115.04   78.79  1.4000E-03  3.1474E+01  5.8652E-16  1.6754E+00  0.0000E+00
  117.64   71.27  120.44  1.4000E-03  2.7008E+01  8.5041E-16  1.8519E+00  0.0000E+00
   67.10  149.80   46.62  1.4000E-03  2.3539E+01  8.2321E-16  2.0539E+00  0.0000E+00
  -40.40  106.57   94.16  1.4000E-03  3.6063E+01  5.3396E-16  1.5435E+00  0.0000E+00
   60.39   30.53   -7.34  1.4000E-03  3.5953E+01  8.2046E-16  1.5463E+00  0.0000E+00
  107.81   84.05   96.18  1.4000E-03  2.1923E+01  7.9844E-16  2.2130E+00  0.0000E+00
   26.94  173.88   11.18  1.4000E-03  2.0276E+01  8.5625E-16  2.3790E+00  0.0000E+00
   13.42  134.49  152.20  1.4000E-03  3.0534E+01  7.5666E-16  1.6549E+00  0.0000E+00
  130.22   47.10   69.85  1.4000E-03  2.4986E+01  7.0890E-16  2.0053E+00  0.0000E+00
  171.02  148.05  155.65  1.4000E-03  1.5815E+01  1.0189E-15  3.0590E+00  0.0000E+00
   98.93   87.74   78.66  1.4000E-03  1.4633E+01  9.6713E-16  3.2831E+00  0.0000E+00
   29.78   46.96  146.96  1.4000E-03  1.3629E+01  1.1107E-15  3.6406E+00  0.0000E+00
  100.44  118.29   51.94  1.4000E-03  1.7670E+01  1.0150E-15  2.8145E+00  0.0000E+00
   88.68   40.11  135.85  1.4000E-03  2.9180E+01  8.1207E-16  1.8101E+00  0.0000E+00
  -30.45   91.62   67.86  1.4000E-03  2.9351E+01  1.0039E-15  1.8905E+00  0.0000E+00
   32.07  144.83  128.51  1.4000E-03  7.0090E+00  1.1834E-15  6.9986E+00  0.0000E+00
  144.73   68.79   41.93  1.4000E-03  3.1094E+01  8.9122E-16  1.7260E+00  0.0000E+00
  114.53   86.19  114.11  1.4000E-03  2.6654E+01  8.1261E-16  1.8395E+00  0.0000E+00
   -7.24   19.25   47.37  1.4000E-03  3.5803E+01  4.7251E-16  1.4880E+00  0.0000E+00
  -12.02   62.81 -163.80  1.4000E-03  4.2524E+00  1.2077E-15  1.1768E+01  0.0000E+00
  103.76  135.07   88.00  1.4000E-03  1.9136E+01  8.0853E-16  2.5057E+00  0.0000E+00
   59.03   32.23  164.31  1.4000E-03  3.9423E+01  5.1980E-16  1.3736E+00  0.0000E+00
  -48.72  112.85   90.27  1.4000E-03  3.3796E+01  4.6397E-16  1.5861E+00  0.0000E+00
   -5.31  154.59  134.27  1.4000E-03  3.3840E+01  5.6363E-16  1.5586E+00  0.0000E+00
  117.08   86.36   65.21  1.4000E-03  2.9030E+01  7.4142E-16  1.6975E+00  0.0000E+00
  125.80  103.82  101.00  1.4000E-03  3.4857E+01  4.2546E-16  1.4899E+00  0.0000E+00
   17.66   12.75   22.80  1.4000E-03  3.8952E+01  3.0264E-16  1.3838E+00  0.0000E+00
    6.85   62.29  177.91  1.4000E-03  1.2020E+01  1.0688E-15  4.0110E+00  0.0000E+00
  107.12  127.76   76.67  1.4000E-03  2.3663E+01  6.8987E-16  2.0990E+00  0.0000E+00
  109.80   72.80  108.74  1.4000E-03  2.2619E+01  8.3018E-16  2.1749E+00  0.0000E+00
   49.68  163.47   33.41  1.4000E-03  2.0362E+01  8.7838E-16  2.3559E+00  0.0000E+00
   51.24  128.91 -177.14  1.4000E-03  3.9847E+01  6.2576E-16  1.3825E+00  0.0000E+00
  129.85   50.62   82.61  1.4000E-03  2.7793E+01  5.9166E-16  1.8591E+00  0.0000E+00
  146.06  144.57  131.14  1.4000E-03  1.8405E+01  9.2543E-16  2.6763E+00  0.0000E+00
   20.41   65.53   36.86  1.4000E-03  2.6566E+01  7.2133E-16  1.8866E+00  0.0000E+00
  -45.82   34.75   98.22  1.4000E-03  2.6042E+01  8.1215E-16  2.0735E+00  0.0000E+00
   83.83  112.43   24.97  1.4000E-03  8.8647E+00  1.2151E-15  5.7192E+00  0.0000E+00
   94.52  177.25   75.40  1.4000E-03  2.2916E+01  7.9024E-16  2.1220E+00  0.0000E+00
   -8.24   87.29    5.27  1.4000E-03  3.9559E+00  1.1662E-15  1.2713E+01  0.0000E+00
   56.83   35.94  146.60  1.4000E-03  2.6697E+01  8.0871E-16  1.8349E+00  0.0000E+00
  114.16  123.76   65.01  1.4000E-03  2.3864E+01  8.3460E-16  2.1377E+00  0.0000E+00
  154.22   89.33  160.00  1.4000E-03  2.4658E+01  1.0971E-15  2.2321E+00  0.0000E+00
   92.75  151.77   73.06  1.4000E-03  2.2091E+01  7.7520E-16  2.1870E+00  0.0000E+00
   -9.51  121.87  124.59  1.4000E-03  1.6758E+01  1.0168E-15  3.0111E+00  0.0000E+00
  130.90   50.78   46.43  1.4000E-03  2.2480E+01  9.1685E-16  2.2345E+00  0.0000E+00
  100.28   86.03  137.07  1.4000E-03  1.3749E+01  1.0885E-15  3.4704E+00  0.0000E+00
  -24.72   38.36   64.80  1.4000E-03  2.5932E+01  7.7928E-16  2.0127E+00  0.0000E+00
   91.68   64.76  106.42  1.4000E-03  1.4760E+01  9.4280E-16  3.2915E+00  0.0000E+00
  147.86  127.50    8.14  1.4000E-03  2.4473E+01  8.4185E-16  2.1903E+00  0.0000E+00
  105.03   23.07  115.94  1.4000E-03  3.4937E+01  4.4261E-16  1.5313E+00  0.0000E+00
   30.48  103.51   18.24  1.4000E-03  2.6965E+01  6.9827E-16  1.8658E+00  0.0000E+00
   -3.77  142.13  158.25  1.4000E-03  1.6853E+01  1.0216E-15  2.8654E+00  0.0000E+00
  107.59   68.15   85.98  1.4000E-03  2.0631E+01  8.0484E-16  2.3324E+00  0.0000E+00
   99.19   89.85  124.04  1.4000E-03  1.2603E+01  1.0880E-15  3.7946E+00  0.0000E+00
  -29.69   42.91   56.59  1.4000E-03  2.1692E+01  8.7751E-16  2.3336E+00  0.0000E+00
   22.20   87.15  178.89  1.4000E-03  2.6690E+01  6.8999E-16  1.8502E+00  0.0000E+00
  116.62  168.48   86.22  1.4000E-03  3.1415E+01  5.2586E-16  1.6222E+00  0.0000E+00
  131.51   59.18  149.59  1.4000E-03  2.8899E+01  6.9617E-16  1.7682E+00  0.0000E+00
   87.27  125.68   64.64  1.4000E-03  1.9189E+01  8.6989E-16  2.5529E+00  0.0000E+00
  -24.33  145.02  110.23  1.4000E-03  2.7990E+01  7.2971E-16  1.9014E+00  0.0000E+00
   97.80   94.41   31.43  1.4000E-03  1.2365E+01  1.0900E-15  3.8699E+00  0.0000E+00
  117.65  121.54  153.03  1.4000E-03  2.4514E+01  8.2289E-16  2.0910E+00  0.0000E+00
  -10.78   68.51   69.17  1.4000E-03  9.9053E+00  1.0950E-15  5.1160E+00  0.0000E+00
   89.13   30.45  115.08  1.4000E-03  2.5114E+01  7.1100E-16  1.9507E+00  0.0000E+00
  149.91   86.83   39.82  1.4000E-03  3.0454E+01  1.0172E-15  1.8058E+00  0.0000E+00
  121.72   62.07   94.05  1.4000E-03  2.8818E+01  5.6836E-16  1.7805E+00  0.0000E+00
   45.95  147.56   13.32  1.4000E-03  3.4585E+01  6.1123E-16  1.4718E+00  0.0000E+00
  -17.67  115.79  137.55  1.4000E-03  1.3559E+01  1.1456E-15  3.7334E+00  0.0000E+00
  123.36   28.06   63.22  1.4000E-03  1.5480E+01  9.4318E-16  3.1260E+00  0.0000E+00
   98.92   62.23  121.20  1.4000E-03  1.8023E+01  9.6304E-16  2.7520E+00  0.0000E+00
  -20.77  118.82   34.52  1.4000E-03  1.8506E+01  1.0411E-15  2.7877E+00  0.0000E+00
   75.04  102.97   94.84  1.4000E-03  1.3435E+01  1.1873E-15  3.9528E+00  0.0000E+00
  148.65   56.96   16.19  1.4000E-03  2.1546E+01  1.0473E-15  2.4749E+00  0.0000E+00
  133.34  129.90  104.11  1.4000E-03  2.6830E+01  6.5220E-16  1.9177E+00  0.0000E+00
   53.57   58.97    6.39  1.4000E-03  3.3299E+01  9.0126E-16  1.6655E+00  0.0000E+00
   48.99    8.65  151.62  1.4000E-03  2.3960E+01  7.7574E-16  2.0321E+00  0.0000E+00
  113.34   99.69   78.87  1.4000E-03  2.6383E+01  6.9369E-16  1.8740E+00  0.0000E+00
  109.82   48.97   97.44  1.4000E-03  2.3615E+01  6.7524E-16  2.0937E+00  0.0000E+00
    8.09  123.79   -5.14  1.4000E-03  1.3997E+01  1.0718E-15  3.4079E+00  0.0000E+00
   19.23  160.61  153.58  1.4000E-03  3.9285E+01  4.2275E-16  1.3952E+00  0.0000E+00
  129.81   70.41   72.48  1.4000E-03  3.4902E+01  4.6785E-16  1.4999E+00  0.0000E+00
  106.97   89.28  160.77  1.4000E-03  2.1859E+01  8.6812E-16  2.2075E+00  0.0000E+00
   -7.58   36.12   76.77  1.4000E-03  1.1930E+01  1.1522E-15  4.3614E+00  0.0000E+00
  -39.53   92.66  116.21  1.4000E-03  3.9510E+01  6.0057E-16  1.4086E+00  0.0000E+00
   90.59  141.02   56.09  1.4000E-03  2.8902E+01  6.4872E-16  1.7668E+00  0.0000E+00
  102.74   59.67  101.71  1.4000E-03  2.0167E+01  7.9484E-16  2.4146E+00  0.0000E+00
    2.20  130.89   -2.36  1.4000E-03  7.3304E+00  1.1557E-15  6.6065E+00  0.0000E+00
   14.06  111.27  160.08  1.4000E-03  2.3114E+01  8.4547E-16  2.0844E+00  0.0000E+00
  131.75   22.40   69.97  1.4000E-03  2.3570E+01  7.3985E-16  2.0864E+00  0.0000E+00
 -177.17  159.11  172.69  1.4000E-03  1.4139E+01  1.0234E-15  3.3991E+00  0.0000E+00
   95.94   89.67   84.66  1.4000E-03  1.2810E+01  9.8846E-16  3.7707E+00  0.0000E+00
    3.41   69.21  153.34  1.4000E-03  1.4747E+01  1.0007E-15  3.3364E+00  0.0000E+00
  100.75  125.79   58.89  1.4000E-03  2.2134E+01  8.6721E-16  2.2843E+00  0.0000E+00
   87.38   11.41  133.08  1.4000E-03  3.8955E+01  2.2075E-16  1.3887E+00  0.0000E+00
    0.54   74.93   39.05  1.4000E-03  1.3076E+01  1.0134E-15  3.6576E+00  0.0000E+00
  102.39  115.83   94.31  1.4000E-03  1.6635E+01  9.0315E-16  2.8657E+00  0.0000E+00
  165.09   53.70   24.92  1.4000E-03  1.0635E+01  1.1585E-15  4.6740E+00  0.0000E+00
  126.97  119.31  104.93  1.4000E-03  2.9615E+01  5.9343E-16  1.7191E+00  0.0000E+00
   14.57   31.04   26.27  1.4000E-03  3.5088E+01  6.2535E-16  1.4887E+00  0.0000E+00
   -7.86   83.74  173.17  1.4000E-03  4.8424E+00  1.1573E-15  1.0384E+01  0.0000E+00
  100.88  154.72   76.24  1.4000E-03  2.5591E+01  6.7056E-16  1.9255E+00  0.0000E+00
   92.80   78.28  147.86  1.4000E-03  7.3992E+00  1.1555E-15  6.5529E+00  0.0000E+00
  -31.24   20.37   71.66  1.4000E-03  3.4523E+01  4.5908E-16  1.5481E+00  0.0000E+00
   79.63   46.56  117.41  1.4000E-03  1.8513E+01  9.0634E-16  2.6169E+00  0.0000E+00
  118.94  116.00   38.24  1.4000E-03  2.5726E+01  8.6896E-16  1.9174E+00  0.0000E+00
  131.40   44.07   89.20  1.4000E-03  2.7435E+01  6.2373E-16  1.9162E+00  0.0000E+00
   71.29  123.05   18.32  1.4000E-03  2.6068E+01  1.0729E-15  2.0730E+00  0.0000E+00
   -6.24  158.27  134.40  1.4000E-03  3.4822E+01  4.9577E-16  1.5174E+00  0.0000E+00
  114.44   92.73   65.69  1.4000E-03  2.6901E+01  7.9056E-16  1.8213E+00  0.0000E+00
  126.06  143.36  112.38  1.4000E-03  1.9988E+01  8.3470E-16  2.4398E+00  0.0000E+00
   -7.07   55.15   37.29  1.4000E-03  1.5422E+01  1.0632E-15  3.1702E+00  0.0000E+00
   56.25   23.13  158.22  1.4000E-03  3.5624E+01  5.0593E-16  1.4511E+00  0.0000E+00
  125.55  104.60   83.66  1.4000E-03  3.4759E+01  4.0512E-16  1.5117E+00  0.0000E+00
  120.69   88.36  124.23  1.4000E-03  3.2318E+01  7.3520E-16  1.5481E+00  0.0000E+00
   67.75  170.35   52.93  1.4000E-03  1.9500E+01  8.7205E-16  2.4657E+00  0.0000E+00
  -41.19  128.28   99.80  1.4000E-03  2.7682E+01  6.5729E-16  1.9141E+00  0.0000E+00
   73.05   58.87   -6.49  1.4000E-03  1.3609E+01  1.2326E-15  3.8545E+00  0.0000E+00
   72.03  117.64  175.34  1.4000E-03  7.8291E+00  1.2231E-15  6.5605E+00  0.0000E+00
  -40.28   53.20   73.84  1.4000E-03  2.7086E+01  7.0420E-16  1.9374E+00  0.0000E+00
   75.61   24.28  112.47  1.4000E-03  1.3611E+01  1.0015E-15  3.5006E+00  0.0000E+00
  111.99  100.89   41.45  1.4000E-03  2.4069E+01  9.3125E-16  2.0040E+00  0.0000E+00
  133.59   98.80  115.72  1.4000E-03  3.9308E+01  4.8291E-16  1.3692E+00  0.0000E+00
   68.68  160.39   44.00  1.4000E-03  2.7278E+01  6.9651E-16  1.8035E+00  0.0000E+00
    2.72  124.33  164.01  1.4000E-03  1.4365E+01  1.0747E-15  3.3247E+00  0.0000E+00
  114.04   38.03   89.19  1.4000E-03  2.3508E+01  6.7812E-16  2.0911E+00  0.0000E+00
  116.58  106.00   93.89  1.4000E-03  2.8023E+01  6.1347E-16  1.7745E+00  0.0000E+00
   16.75   20.11   12.37  1.4000E-03  2.9627E+01  7.0166E-16  1.6882E+00  0.0000E+00
   88.03   56.29  130.40  1.4000E-03  2.0952E+01  9.5189E-16  2.4210E+00  0.0000E+00
  126.76  125.59   64.61  1.4000E-03  2.4708E+01  8.8496E-16  2.1079E+00  0.0000E+00
  120.26   70.22  160.86  1.4000E-03  2.9866E+01  6.3916E-16  1.6766E+00  0.0000E+00
   84.10  125.93   73.00  1.4000E-03  1.3318E+01  9.8530E-16  3.6284E+00  0.0000E+00
  -24.19  166.85  120.15  1.4000E-03  3.4881E+01  3.9766E-16  1.5025E+00  0.0000E+00
   96.18  107.78   46.54  1.4000E-03  1.2574E+01  1.1044E-15  3.8801E+00  0.0000E+00
   97.50   20.36  108.77  1.4000E-03  2.7591E+01  6.3100E-16  1.7999E+00  0.0000E+00
  -15.08   81.28   27.12  1.4000E-03  6.8110E+00  1.2257E-15  7.4920E+00  0.0000E+00
   17.31  147.18  161.30  1.4000E-03  3.3009E+01  6.7247E-16  1.5419E+00  0.0000E+00
  123.70   61.25   80.41  1.4000E-03  2.9022E+01  5.6074E-16  1.7453E+00  0.0000E+00
  144.10  129.83  122.16  1.4000E-03  2.3324E+01  8.6386E-16  2.1904E+00  0.0000E+00
   66.31   65.01   25.20  1.4000E-03  1.2760E+01  1.1171E-15  3.9966E+00  0.0000E+00
  -25.23   87.73   95.09  1.4000E-03  2.0564E+01  1.1133E-15  2.6675E+00  0.0000E+00
   73.53  150.84   13.26  1.4000E-03  2.4939E+01  1.1014E-15  2.1877E+00  0.0000E+00
   84.26   54.34  154.10  1.4000E-03  1.4291E+01  1.1956E-15  3.6076E+00  0.0000E+00
  -35.75  115.74   83.97  1.4000E-03  2.7831E+01  8.6943E-16  1.9715E+00  0.0000E+00
   66.57   63.36  138.77  1.4000E-03  2.2953E+01  9.2769E-16  2.2516E+00  0.0000E+00
  168.77    5.48   31.70  1.4000E-03  2.3949E+01  7.6420E-16  2.0382E+00  0.0000E+00
  121.52  149.45   97.42  1.4000E-03  2.4157E+01  6.9247E-16  2.0492E+00  0.0000E+00
   11.46   61.96   16.59  1.4000E-03  2.1264E+01  9.2406E-16  2.2520E+00  0.0000E+00
  -16.46   63.11  164.99  1.4000E-03  1.4370E+01  1.1065E-15  3.6468E+00  0.0000E+00
   99.24  117.32   69.05  1.4000E-03  1.9629E+01  8.4430E-16  2.5010E+00  0.0000E+00
  102.51  125.34  112.83  1.4000E-03  1.1505E+01  1.0855E-15  4.2060E+00  0.0000E+00
  -25.78   62.13   44.18  1.4000E-03  1.9298E+01  1.0917E-15  2.6837E+00  0.0000E+00
   36.86   30.65  168.46  1.4000E-03  2.7634E+01  8.1045E-16  1.7695E+00  0.0000E+00
  115.21  114.62   81.23  1.4000E-03  2.6486E+01  6.3554E-16  1.8941E+00  0.0000E+00
  124.08   75.94  123.09  1.4000E-03  3.3167E+01  7.2618E-16  1.5429E+00  0.0000E+00
   71.57  148.10   49.93  1.4000E-03  2.4191E+01  7.9711E-16  2.0074E+00  0.0000E+00
  -35.69  104.26   96.78  1.4000E-03  3.3791E+01  7.2210E-16  1.6605E+00  0.0000E+00
   61.88   28.65   -2.09  1.4000E-03  2.7810E+01  1.0682E-15  1.9786E+00  0.0000E+00
   91.83  111.21 -173.23  1.4000E-03  1.0031E+01  1.0724E-15  4.7943E+00  0.0000E+00
  -26.16   57.06   85.56  1.4000E-03  1.8292E+01  1.0310E-15  2.9266E+00  0.0000E+00
   87.03   69.07  128.54  1.4000E-03  1.3505E+01  1.0693E-15  3.6974E+00  0.0000E+00
  118.11  168.12   50.28  1.4000E-03  1.4697E+01  1.1840E-15  3.6478E+00  0.0000E+00
  117.03   37.38   99.46  1.4000E-03  2.8055E+01  5.7990E-16  1.8386E+00  0.0000E+00
   35.19  123.58    8.39  1.4000E-03  3.0792E+01  7.4930E-16  1.6266E+00  0.0000E+00
  -14.87  152.05  139.91  1.4000E-03  2.3815E+01  8.1397E-16  2.0773E+00  0.0000E+00
  105.79   93.67   72.73  1.4000E-03  2.0072E+01  8.8016E-16  2.4010E+00  0.0000E+00
   94.12   44.23  126.58  1.4000E-03  2.6425E+01  7.9901E-16  1.9537E+00  0.0000E+00
  -29.13   91.63   59.61  1.4000E-03  2.7745E+01  1.0583E-15  1.9776E+00  0.0000E+00
   30.13  151.69  114.26  1.4000E-03  1.4925E+01  1.0448E-15  3.1926E+00  0.0000E+00
  138.96   80.10   31.47  1.4000E-03  3.8825E+01  6.5728E-16  1.4125E+00  0.0000E+00
  137.92  117.01  112.13  1.4000E-03  3.1170E+01  6.6902E-16  1.6970E+00  0.0000E+00
   39.49   35.27   21.22  1.4000E-03  3.0182E+01  9.9009E-16  1.8109E+00  0.0000E+00
   17.04   55.81 -176.43  1.4000E-03  2.1322E+01  9.4746E-16  2.2463E+00  0.0000E+00
  113.50  133.96   83.76  1.4000E-03  2.5148E+01  6.2451E-16  1.9901E+00  0.0000E+00
  112.98   76.79   90.76  1.4000E-03  2.5646E+01  6.8408E-16  1.9198E+00  0.0000E+00
   23.61  158.13   -0.28  1.4000E-03  2.5855E+01  7.9530E-16  1.8891E+00  0.0000E+00
   59.07   94.73  155.81  1.4000E-03  2.3717E+01  9.7856E-16  2.2998E+00  0.0000E+00
  143.31   33.63   59.89  1.4000E-03  2.3005E+01  7.7284E-16  2.1665E+00  0.0000E+00
  140.78  124.25  139.86  1.4000E-03  2.4720E+01  9.4670E-16  2.0860E+00  0.0000E+00
    4.69   55.87   56.97  1.4000E-03  1.8914E+01  9.5726E-16  2.6624E+00  0.0000E+00
  -50.19   20.71  109.16  1.4000E-03  2.5082E+01  9.8889E-16  2.1936E+00  0.0000E+00
   87.29  110.57   35.56  1.4000E-03  1.0294E+01  1.1739E-15  4.8699E+00  0.0000E+00
   83.61   72.68  157.45  1.4000E-03  4.5938E+00  1.2168E-15  1.0967E+01  0.0000E+00
  -45.96  155.34   82.53  1.4000E-03  3.0145E+01  7.5643E-16  1.8201E+00  0.0000E+00
   12.58  123.03  138.26  1.4000E-03  2.4880E+01  8.3229E-16  2.0178E+00  0.0000E+00
  142.86   42.66   49.74  1.4000E-03  2.0469E+01  9.0652E-16  2.4382E+00  0.0000E+00
  128.35  134.28   95.43  1.4000E-03  2.6835E+01  6.1112E-16  1.9156E+00  0.0000E+00
   53.50   57.48   -3.44  1.4000E-03  3.8728E+01  6.8165E-16  1.4336E+00  0.0000E+00
   46.60   24.71  148.83  1.4000E-03  1.9341E+01  9.4310E-16  2.4670E+00  0.0000E+00
  108.35  110.78   69.47  1.4000E-03  2.2372E+01  8.1769E-16  2.2046E+00  0.0000E+00
  104.36   36.60  117.01  1.4000E-03  2.9054E+01  6.6566E-16  1.8010E+00  0.0000E+00
   26.19  106.97   20.58  1.4000E-03  2.2829E+01  8.0911E-16  2.1668E+00  0.0000E+00
   50.83  153.37 -170.56  1.4000E-03  3.9969E+01  4.0291E-16  1.3451E+00  0.0000E+00
  130.46   72.36   89.00  1.4000E-03  3.6009E+01  3.7011E-16  1.4915E+00  0.0000E+00
  140.36  104.86  135.88  1.4000E-03  3.6133E+01  7.4589E-16  1.4979E+00  0.0000E+00
   11.12   16.50   62.23  1.4000E-03  7.7112E+00  1.2170E-15  6.7296E+00  0.0000E+00
  -33.51   80.33  109.70  1.4000E-03  3.1533E+01  9.1316E-16  1.7622E+00  0.0000E+00
   88.73  132.88   42.11  1.4000E-03  2.5414E+01  9.3014E-16  2.0594E+00  0.0000E+00
  109.58  100.65   98.64  1.4000E-03  2.2626E+01  7.9623E-16  2.1356E+00  0.0000E+00
   -5.97   31.09   29.44  1.4000E-03  2.1257E+01  9.2257E-16  2.2981E+00  0.0000E+00
   39.10   61.05  165.09  1.4000E-03  3.0874E+01  7.0823E-16  1.6427E+00  0.0000E+00
  111.90  150.53   70.81  1.4000E-03  3.2070E+01  5.2358E-16  1.6545E+00  0.0000E+00
 -168.21   22.30  178.08  1.4000E-03  1.4291E+01  1.0246E-15  3.3550E+00  0.0000E+00
  101.05  101.92   84.37  1.4000E-03  1.7344E+01  8.8562E-16  2.7766E+00  0.0000E+00
  -12.28  140.73  128.22  1.4000E-03  2.6076E+01  8.1325E-16  1.9712E+00  0.0000E+00
  113.68   82.91   59.91  1.4000E-03  2.5338E+01  8.6066E-16  1.9091E+00  0.0000E+00
  131.08  158.96  129.07  1.4000E-03  1.1287E+01  1.0452E-15  4.3286E+00  0.0000E+00
  -17.48   66.45   49.60  1.4000E-03  1.2546E+01  1.1466E-15  4.0488E+00  0.0000E+00
   94.83   56.00   94.46  1.4000E-03  1.3970E+01  9.4502E-16  3.4186E+00  0.0000E+00
  149.16  107.33   -6.24  1.4000E-03  2.8402E+01  9.4642E-16  1.9534E+00  0.0000E+00
  114.36   65.31  104.61  1.4000E-03  2.5260E+01  7.2958E-16  1.9882E+00  0.0000E+00
   46.95  152.04   23.82  1.4000E-03  2.6195E+01  8.0618E-16  1.8574E+00  0.0000E+00
  -18.13  118.47  147.27  1.4000E-03  1.2842E+01  1.1668E-15  3.9375E+00  0.0000E+00
  109.49   44.38   77.97  1.4000E-03  1.7051E+01  8.8845E-16  2.8037E+00  0.0000E+00
   88.82   81.42  141.83  1.4000E-03  4.2996E+00  1.1778E-15  1.1435E+01  0.0000E+00
  -37.43   31.01   66.98  1.4000E-03  2.5657E+01  7.0207E-16  1.9746E+00  0.0000E+00
    2.39   80.96  108.41  1.4000E-03  1.3692E+01  9.8788E-16  3.4866E+00  0.0000E+00
   93.71  129.51   20.94  1.4000E-03  7.8324E+00  1.1655E-15  6.2663E+00  0.0000E+00
  118.91   55.20  108.88  1.4000E-03  2.5166E+01  7.8889E-16  2.0493E+00  0.0000E+00
   58.91  143.09   30.55  1.4000E-03  3.0774E+01  7.0507E-16  1.6290E+00  0.0000E+00
   18.16  172.15  172.30  1.4000E-03  2.8367E+01  6.4942E-16  1.7539E+00  0.0000E+00
  111.21   95.55   81.93  1.4000E-03  2.4822E+01  7.2749E-16  1.9729E+00  0.0000E+00
  120.04  137.02  100.42  1.4000E-03  2.2810E+01  7.1950E-16  2.1519E+00  0.0000E+00
   -0.17   47.35   27.91  1.4000E-03  1.9357E+01  1.0025E-15  2.5043E+00  0.0000E+00
   68.15   14.79  142.40  1.4000E-03  3.2313E+01  5.3747E-16  1.5716E+00  0.0000E+00
  130.76   81.97   75.26  1.4000E-03  3.9172E+01  2.8824E-16  1.3712E+00  0.0000E+00
  119.25   85.10  177.34  1.4000E-03  3.2152E+01  5.1070E-16  1.5846E+00  0.0000E+00
   77.09  137.93   83.26  1.4000E-03  2.4553E+00  1.1903E-15  2.0191E+01  0.0000E+00
  -29.12  127.43  122.35  1.4000E-03  2.2699E+01  9.0373E-16  2.2759E+00  0.0000E+00
   99.95   81.08   50.55  1.4000E-03  1.2752E+01  1.0988E-15  3.7568E+00  0.0000E+00
  104.01   54.95  110.93  1.4000E-03  2.2260E+01  7.8948E-16  2.2414E+00  0.0000E+00
    1.30  111.42   14.87  1.4000E-03  1.0484E+01  1.0839E-15  4.7094E+00  0.0000E+00
   39.53   92.41  176.31  1.4000E-03  3.9298E+01  1.3345E-16  1.3757E+00  0.0000E+00
  128.65   11.65   81.40  1.4000E-03  3.1087E+01  5.3228E-16  1.6360E+00  0.0000E+00
  161.19  155.66  138.08  1.4000E-03  2.2712E+01  8.3296E-16  2.1668E+00  0.0000E+00
   97.77   97.43   63.62  1.4000E-03  1.3770E+01  1.0233E-15  3.5045E+00  0.0000E+00
    1.91   54.65  120.07  1.4000E-03  2.1164E+01  9.6750E-16  2.2959E+00  0.0000E+00
   96.76  113.63   30.80  1.4000E-03  1.0747E+01  1.1398E-15  4.5086E+00  0.0000E+00
   79.07   25.34  147.29  1.4000E-03  3.7173E+01  5.8406E-16  1.4751E+00  0.0000E+00
  -24.67   83.07   68.59  1.4000E-03  1.9993E+01  1.1331E-15  2.7029E+00  0.0000E+00
   85.01  113.54  131.98  1.4000E-03  1.7504E+01  1.0621E-15  2.9087E+00  0.0000E+00
  151.10   54.08   44.03  1.4000E-03  2.0891E+01  1.0010E-15  2.4502E+00  0.0000E+00
  119.13  116.71   90.40  1.4000E-03  2.7967E+01  5.6924E-16  1.8014E+00  0.0000E+00
   25.72   32.56    5.32  1.4000E-03  3.0966E+01  7.4552E-16  1.6102E+00  0.0000E+00
  -28.36  108.10  129.29  1.4000E-03  2.5356E+01  1.0410E-15  2.1134E+00  0.0000E+00
   87.65  162.88   58.59  1.4000E-03  3.0468E+01  5.6086E-16  1.6544E+00  0.0000E+00
   98.58    3.53  100.31  1.4000E-03  2.2761E+01  7.9248E-16  2.1344E+00  0.0000E+00
  -15.14   86.19    7.98  1.4000E-03  8.4078E+00  1.2125E-15  6.2127E+00  0.0000E+00
    5.54  136.24  145.49  1.4000E-03  2.7956E+01  8.1406E-16  1.8017E+00  0.0000E+00
  129.91   48.78   66.87  1.4000E-03  2.4895E+01  7.3344E-16  2.0069E+00  0.0000E+00
  152.29  116.29  145.16  1.4000E-03  2.1117E+01  1.0947E-15  2.4826E+00  0.0000E+00
   90.03   62.91   68.02  1.4000E-03  7.0320E+00  1.1933E-15  7.0967E+00  0.0000E+00
  -21.59   96.54  122.03  1.4000E-03  1.5808E+01  1.1843E-15  3.3364E+00  0.0000E+00
   89.75  147.46   47.21  1.4000E-03  3.3571E+01  6.0126E-16  1.5886E+00  0.0000E+00
   98.94   57.22  133.25  1.4000E-03  1.5914E+01  1.0806E-15  3.1496E+00  0.0000E+00
   26.71  121.62   36.03  1.4000E-03  1.8692E+01  9.8909E-16  2.6865E+00  0.0000E+00
  100.54   85.02  103.81  1.4000E-03  1.6006E+01  9.4632E-16  3.0068E+00  0.0000E+00
  179.17   19.34   20.20  1.4000E-03  2.1751E+01  8.5558E-16  2.2306E+00  0.0000E+00
  146.05  162.85  124.16  1.4000E-03  2.3567E+01  7.7116E-16  2.0839E+00  0.0000E+00
   34.11   89.33   20.36  1.4000E-03  3.1945E+01  4.8247E-16  1.6246E+00  0.0000E+00
    7.78   38.20 -169.84  1.4000E-03  1.7515E+01  1.0289E-15  2.7300E+00  0.0000E+00
  108.41  120.80   85.75  1.4000E-03  2.2221E+01  7.2443E-16  2.1936E+00  0.0000E+00
   63.48  137.79 -172.93  1.4000E-03  3.1099E+01  9.9921E-16  1.7685E+00  0.0000E+00
  -42.46   62.95   82.63  1.4000E-03  3.1513E+01  5.9322E-16  1.7126E+00  0.0000E+00
   71.23   27.02  125.11  1.4000E-03  2.0095E+01  8.8430E-16  2.3794E+00  0.0000E+00
  115.00  104.89   55.24  1.4000E-03  2.6091E+01  8.7105E-16  1.8867E+00  0.0000E+00
  127.09   92.40   95.99  1.4000E-03  3.7869E+01  2.6138E-16  1.4015E+00  0.0000E+00
   49.18  168.48   16.13  1.4000E-03  3.4698E+01  4.3762E-16  1.4882E+00  0.0000E+00
